MODE: APCP at A12 vs APCP at A12

Forecast Observation

1 2 3 4

5

1 2 3 4

5 6

7 8

Fcst Obs Interest

5 5 0.9901 1 1 0.9418 2 3 0.7872 3 2 0.7293 ---------------------------------- 2 2 0.6970 2 4 0.6924 1 2 0.6880 2 1 0.6154 3 3 0.5862 1 4 0.5179 4 2 0.4929 1 3 0.4768 4 6 0.4738 4 3 0.4443 4 4 0.4237 3 4 0.4083 3 1 0.4060 4 1 NA 5 3 NA 5 4 NA 1 5 NA 2 5 NA 3 5 NA 4 5 NA 5 1 NA 1 6 NA 2 6 NA 3 6 NA 5 2 NA 5 6 NA 1 7 NA 2 7 NA 3 7 NA 4 7 NA 5 7 NA 1 8 NA 2 8 NA 3 8 NA 4 8 NA 5 8 NA

Forecast Observation Model: WRF Field: APCP APCP Level: A12 A12 Units: mm mm Initial: 20050807 00:00:00

20050808 00:00:00 Valid: 20050808 00:00:00

20050808 00:00:00 Accum: 12:00:00 12:00:00

Centroid/Boundary: 4.00 4.00 Convex Hull/Angle: 0.00 1.00 Area/Intersection Area: 2.00 2.00 Complexity/Intensity: 0.00 0.00 Total Interest Thresh: 0.70

Forecast Observation Mask M/G/P: on/off/off on/off/off Raw Thresh: >=0.00 >=0.00 Conv Radius: 4 gs 4 gs Conv Thresh: >=1.00 >=1.00 Area Thresh: >=100 gs >=100 gs Inten Thresh: p100>=0.00 p100>=0.00 Merge Thresh: >=1.25 >=1.25 Merging: none none Matching: match/merge Simple/M/U: 5/4/1 8/4/4 Area: 25877 gs 29915 gs Area M/U: 25687/190 28438/1477 Cluster: 4 4 MMI: 0.7872 0.7109 MMI (F+O): 0.7293

MODE: APCP at A12 vs APCP at A12 Forecast

0.00

0.00

1.25

2.50

3.75

5.00

6.25

7.50

8.75

10.00

11.25

12.50

13.75

15.00

16.25

17.50

18.75

20.00

21.25

22.50

23.75

25.00

26.25

27.50

28.75

30.00

31.25

32.50

33.75

35.00

36.25

37.50

38.75

40.00

41.25

42.50

43.75

45.00

46.25

47.50

48.75

MODE: APCP at A12 vs APCP at A12 Observation

0.00

0.00

1.25

2.50

3.75

5.00

6.25

7.50

8.75

10.00

11.25

12.50

13.75

15.00

16.25

17.50

18.75

20.00

21.25

22.50

23.75

25.00

26.25

27.50

28.75

30.00

31.25

32.50

33.75

35.00

36.25

37.50

38.75

40.00

41.25

42.50

43.75

45.00

46.25

47.50

48.75

Forecast Objects with Observation Outlines

Observation Objects with Forecast Outlines

Cluster Object Information

Forecast Observation

1

2 3 4

1

2 3 4

CLUS PAIR CEN DIST ANG DIFF

FCST AREA OBS AREA

INTER AREA

UNION AREA SYM DIFF

FCST INT50 OBS INT50

FCST INT90 OBS INT90 TOT INTR

1 37.94 22.71 24299 27078 17852 33525 15673 4.07 2.62 12.71 8.38 0.9901

2 26.42 40.68 750 992 142 1600 1458 1.26 1.63 1.67 2.29 0.9418

3 8.65 30.88 449 107 85 471 386 1.28 1.34 1.81 1.74 0.7872

4 30.45 86.26 189 261 0 450 450 1.21 1.25 1.42 1.58 0.7293