300 500 700

320320

P [hPa]

300 500 700

320320320320

300 500 700

300 500 700

300 500 700

300 500 700 -130 -125 -120 -115 -110 -105 W. Long.

-130 -125 -120 -115 -110 -105

2.0 4.0

Z [Km]

W. Long.

Pa s^{-1}

-1.5 -1 -0.5 0 0.5 1 1.5

a

00/15

h

00/15

b

06/15

i

06/15

c

12/15

j

12/15

d

18/15

k

18/15

e

00/16

l

00/16

f

06/16

m

06/16

g