140^° W 120^° W

100^° W

35^° N

45^° N

55^° N

Long Term Mean Layers Combined

0 0.2308

0.4615

0.6923

0.9231

1.1539

1.3846

1.6154

1.8462

2.077

2.3077

2.5385

2.7693 3 3.2308

3.4616

3.6924

3.9231

4.1539

4.3847

4.6154

4.8462

5.077

5.3078

5.5385

5.7693 x 10^{-18}