140^° W 120^° W 100^° W

35^° N

45^° N

55^° N

7

0.1 0.20.3

0.40.5

0.60.7

0.80.9 1.1 1.21.3

1.41.5

1.61.7

1.81.9 2.1 2.22.3

2.42.5

2.62.7

2.82.9 3.1 3.23.3

3.43.5

3.63.7

3.83.9 4

140^° W 120^° W 100^° W

35^° N

45^° N

55^° N

8

0.1 0.20.3

0.40.5

0.60.7

0.80.9 1.1 1.21.3

1.41.5

1.61.7

1.81.9 2.1 2.22.3

2.42.5

2.62.7

2.82.9 3.1 3.23.3

3.43.5

3.63.7

3.83.9 4

140^° W 120^° W 100^° W

35^° N

45^° N

55^° N

9

0.1 0.20.3

0.40.5

0.60.7

0.80.9 1.1 1.21.3

1.41.5

1.61.7

1.81.9 2.1 2.22.3

2.42.5

2.62.7

2.82.9 3.1 3.23.3

3.43.5

3.63.7

3.83.9 4

140^° W 120^° W 100^° W

35^° N

45^° N

55^° N

10

0.1 0.20.3

0.40.5

0.60.7

0.80.9 1.1 1.21.3

1.41.5

1.61.7

1.81.9 2.1 2.22.3

2.42.5

2.62.7

2.82.9 3.1 3.23.3

3.43.5

3.63.7

3.83.9 4

140^° W 120^° W 100^° W

35^° N

45^° N

55^° N

11

0.1 0.20.3

0.40.5

0.60.7

0.80.9 1.1 1.21.3

1.41.5

1.61.7

1.81.9 2.1 2.22.3

2.42.5

2.62.7

2.82.9 3.1 3.23.3

3.43.5

3.63.7

3.83.9 4

140^° W 120^° W 100^° W

35^° N

45^° N

55^° N

12

0.1 0.20.3

0.40.5

0.60.7

0.80.9 1.1 1.21.3

1.41.5

1.61.7

1.81.9 2.1 2.22.3

2.42.5

2.62.7

2.82.9 3.1 3.23.3

3.43.5

3.63.7

3.83.9 4