Pot. Temp. [K]

285 290 295 300

1400

1500

1600

1700

1800

Time HH:MM [UTC]

03:56 04:03 04:09 04:16 03:56 04:03 04:09 04:16 03:56 04:03 04:09

0 10 20 u v

Ri 0 2 4

1400

1500

1600

1700

1800